Scale chr4: Gap

RepeatMasker

10 kb dm3 350,000 355,000 360,000 365,000 370,000 375,000 Gap Locations

FlyBase Protein-Coding Genes Release 5.50

Repeating Elements by RepeatMasker

CG32850-RB PMCA-RQ PMCA-RJ PMCA-RK PMCA-RL PMCA-RO PMCA-RP PMCA-RR PMCA-RI PMCA-RS PMCA-RM PMCA-RN